en-us	QR code

en-us	Add QR code to your site.

en-us	QR image size:

en-us	The size of QR image, default is 150.

en-us	The width of the white border around the data portion of the code, the range is 0-40 ,default is 2.

en-us	Dynamically load QR code:

en-us	How to display:

en-us	QR code icon + Text

en-us	QR code icon

en-us	Show QR code out directly when on the product page: